en	Adminer

en	<h3>Access Denied</h3><p>This Adminer-Module was configured with IP-based access restrictions and your REMOTE_ADDR (%s) is not in TYPO3 devIPmask.</p>

en	<h3>Access Denied</h3><p>This Adminer-Module was configured with IP-based access restrictions and your REMOTE_ADDR (%s) is not in the list of allowed IPs.</p>